# Customization

### `settings.pagination.perPage`

How many items should be retrieved per page. Defaults to 20.

### `settings.theme.base`

Configure the base color scheme. Defaults to `automatic`, which switches between dark and light mode based on the users' browsers' preference. Choices: `automatic`, `dark`, `light`.

import Global from "../_global/global.mdx";

<Global />
