// This file is autogenerated, DO NOT EDIT
// Use `node scripts/generate-docs-examples.js` to generate the docs examples

[source, js]
----
const response = await client.indices.putIndexTemplate({
  name: "sensor-template",
  index_patterns: ["sensor-*"],
  data_stream: {},
  template: {
    lifecycle: {
      downsampling: [
        {
          after: "1d",
          fixed_interval: "1h",
        },
      ],
    },
    settings: {
      "index.mode": "time_series",
    },
    mappings: {
      properties: {
        node: {
          type: "keyword",
          time_series_dimension: true,
        },
        temperature: {
          type: "half_float",
          time_series_metric: "gauge",
        },
        voltage: {
          type: "half_float",
          time_series_metric: "gauge",
        },
        "@timestamp": {
          type: "date",
        },
      },
    },
  },
});
console.log(response);
----
