[[reference-connector-update_error]]

////////
===========================================================================================================================
||                                                                                                                       ||
||                                                                                                                       ||
||                                                                                                                       ||
||        ██████╗ ███████╗ █████╗ ██████╗ ███╗   ███╗███████╗                                                            ||
||        ██╔══██╗██╔════╝██╔══██╗██╔══██╗████╗ ████║██╔════╝                                                            ||
||        ██████╔╝█████╗  ███████║██║  ██║██╔████╔██║█████╗                                                              ||
||        ██╔══██╗██╔══╝  ██╔══██║██║  ██║██║╚██╔╝██║██╔══╝                                                              ||
||        ██║  ██║███████╗██║  ██║██████╔╝██║ ╚═╝ ██║███████╗                                                            ||
||        ╚═╝  ╚═╝╚══════╝╚═╝  ╚═╝╚═════╝ ╚═╝     ╚═╝╚══════╝                                                            ||
||                                                                                                                       ||
||                                                                                                                       ||
||    This file is autogenerated, DO NOT send pull requests that changes this file directly.                             ||
||    You should update the script that does the generation, which can be found in:                                      ||
||    https://github.com/elastic/elastic-client-generator-js                                                             ||
||                                                                                                                       ||
||    You can run the script with the following command:                                                                 ||
||       npm run elasticsearch -- --version <version>                                                                    ||
||                                                                                                                       ||
||                                                                                                                       ||
||                                                                                                                       ||
===========================================================================================================================
////////

[discrete]
=== client.connector.updateError

Update the connector error field. Set the error field for the connector. If the error provided in the request body is non-null, the connector’s status is updated to error. Otherwise, if the error is reset to null, the connector status is updated to connected.

{ref}/update-connector-error-api.html[{es} documentation]

[discrete]
==== Function signature

[source,ts]
----
(ConnectorUpdateErrorRequest, options?): Promise<ConnectorUpdateErrorResponse>
----

[discrete]
===== `ConnectorUpdateErrorRequest`

[source,ts]
----
interface ConnectorUpdateErrorRequest extends <<shared-type-request-base, RequestBase>> {
  connector_id: <<shared-type-id, Id>>
  error: SpecUtilsWithNullValue<string>
}
----

[discrete]
===== `ConnectorUpdateErrorResponse`

[source,ts]
----
interface ConnectorUpdateErrorResponse {
  result: <<shared-type-result, Result>>
}
----

